ALTER TABLE preferences DROP COLUMN kv_continued_interval_tokens;
ALTER TABLE preferences DROP COLUMN kv_cold_max_tokens;
ALTER TABLE preferences DROP COLUMN kv_min_tokens;
ALTER TABLE preferences DROP COLUMN kv_budget_gib;
